<template>
<div class="fgmtyycl _panel" :style="{ top: top + 'px', left: left + 'px' }" @mouseover="() => { $emit('mouseover'); }" @mouseleave="() => { $emit('mouseleave'); }">
	<x-url-preview :url="url" style="width: 600px;"/>
</div>
</template>

<script lang="ts">
import Vue from 'vue';
import i18n from '../i18n';
import XUrlPreview from './url-preview.vue';

export default Vue.extend({
	i18n,

	components: {
		XUrlPreview
	},

	props: {
		url: {
			type: String,
			required: true
		},
		source: {
			required: true
		}
	},

	data() {
		return {
			u: null,
			top: 0,
			left: 0,
		};
	},

	mounted() {
		const rect = this.source.getBoundingClientRect();
		const x = ((rect.left + (this.source.offsetWidth / 2)) - (300 / 2)) + window.pageXOffset;
		const y = rect.top + this.source.offsetHeight + window.pageYOffset;

		this.top = y;
		this.left = x;
	},
});
</script>

<style lang="scss" scoped>
.fgmtyycl {
	position: absolute;
	z-index: 11000;
	//width: 300px;
	overflow: hidden;
}
</style>
